    Modfiy Group Configuration

    This window allows you to modify a configured group. This
    functionality will not work on NT systems since the numeric
    GID is a constant value based on the Group name.
    The window contains the following fields:

    Hostnames

    Enter the name of the hosts whose group configurations you wish 
    to change. If left empty, all hosts in the current pool will be
    modified.

    Group Name

    This read-only field specifies which group is being modified.

    Group ID

    Enter the new group id here.

    Buttons

    This window contains the following buttons:

    Modify

    Press this button to save any changes made to the window.

    Clear Fields

    This button will clear the text fields in the window.

    Close

    This button will close the window without making any changes.    

